CSC ME234/2-7. Runs 10597-10617. Plateau (ALCT) Qthr=20 fC. FNAL 2000

3.2

3.4

3.6

3.8

0 25 50 Wire group

Begin of plateau, kV

3.2

3.4

3.6

3.8

0 25 50 Wire group

Begin of plateau, kV

3.2

3.4

3.6

3.8

0 25 50 Wire group

Begin of plateau, kV

3.2

3.4

3.6

3.8

0 25 50 Wire group

Begin of plateau, kV

3.2

3.4

3.6

3.8

0 25 50 Wire group

Begin of plateau, kV

3.2

3.4

3.6

3.8

0 25 50 Wire group

Begin of plateau, kV

0

10

20

30

40

50

60

70

3.2 3.4 3.6 kV

Number of wire groups, all layers

CSC ME234/2-7. Runs 10597-10617. HV50 (ALCT) Qthr=20 fC. FNAL 2000

3

3.2

3.4

3.6

0 25 50 Wire group

HV50, kV

3

3.2

3.4

3.6

0 25 50 Wire group

HV50, kV

3

3.2

3.4

3.6

0 25 50 Wire group

HV50, kV

3

3.2

3.4

3.6

0 25 50 Wire group

HV50, kV

3

3.2

3.4

3.6

0 25 50 Wire group

HV50, kV

3

3.2

3.4

3.6

0 25 50 Wire group

HV50, kV

0

10

20

30

40

50

60

70

3 3.2 3.4 kV

Number of wire groups, all layers

CSC ME234/2-7. Runs 10597-10617. Sigma(ALCT) Qthr=20 fC. FNAL 2000

0

0.1

0.2

0.3

0 25 50 Wire group

Sigma, kV

0

0.1

0.2

0.3

0 25 50 Wire group

Sigma, kV

0

0.1

0.2

0.3

0 25 50 Wire group

Sigma, kV

0

0.1

0.2

0.3

0 25 50 Wire group

Sigma, kV

0

0.1

0.2

0.3

0 25 50 Wire group

Sigma, kV

0

0.1

0.2

0.3

0 25 50 Wire group

Sigma, kV

0

10

20

30

40

50

60

70

0.1 0.2 kV

Number of wire groups, all layers

CSC ME234/2-7. Runs 10597-10617. Max. eff.(ALCT) Qthr=20 fC. FNAL 2000

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

CSC ME234/2-7. Runs 10597-10617. ALCT eff. vs HV. Qthr=20 fC. FNAL 2000

0 25 50 75 100

3 3.25 3.5 3.75 4 HV, kV

Eff. %

0 25 50 75 100

3 3.25 3.5 3.75 4 HV, kV

Eff. %

0 25 50 75 100

3 3.25 3.5 3.75 4 HV, kV

Eff. %

0 25 50 75 100

3 3.25 3.5 3.75 4 HV, kV

Eff. %

0 25 50 75 100

3 3.25 3.5 3.75 4 HV, kV

Eff. %

0 25 50 75 100

3 3.25 3.5 3.75 4 HV, kV

Eff. %