Anode cross-talk in AD96D. Test thru cath. strip. P2p2 CERN Sep 99

100 200 300 400

500 1000 1500 2000 DAC code

Counts

100 200 300 400

500 1000 1500 2000 DAC code

Counts

100 200 300 400

500 1000 1500 2000 DAC code

Counts

100 200 300 400

500 1000 1500 2000 DAC code

Counts

100 200 300 400

500 1000 1500 2000 DAC code

Counts

100 200 300 400

500 1000 1500 2000 DAC code

Counts