AD96D on P2P2. Test thru cath. strip. DAC=1500. CERN Sep 99

50 55 60 65 70

0 20 40 60 Ch

Mean time, nsec

50 55 60 65 70

0 20 40 60 Ch

Mean time, nsec

50 55 60 65 70

0 20 40 60 Ch

Mean time, nsec

50 55 60 65 70

0 20 40 60 Ch

Mean time, nsec

50 55 60 65 70

0 20 40 60 Ch

Mean time, nsec

50 55 60 65 70

0 20 40 60 Ch

Mean time, nsec