P2P2 Effective Capacitances from Calibration at CERN and FNAL Sep-Oct 99

0.2

0.4

0.6

0.8

0 20 40 60 ch

Eff. C, pF

0.2

0.4

0.6

0.8

0 20 40 60 ch

Eff. C, pF

0.2

0.4

0.6

0.8

0 20 40 60 ch

Eff. C, pF

0.2

0.4

0.6

0.8

0 20 40 60 ch

Eff. C, pF

0.2

0.4

0.6

0.8

0 20 40 60 ch

Eff. C, pF

0.2

0.4

0.6

0.8

0 20 40 60 ch

Eff. C, pF