CSC ME234/2-1. Runs 10339-10358. Max. eff.(TDC and ALCT) Qthr=40 fC. FNAL July 2

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %

80 85 90 95 100

0 20 40 60 Wire group

Max. eff. %