Anode P2p2 Eff. vs HV at Qth=20 fC Runs 669-675 CERN 99 Test Beam

0 1 2 3 4 5 6 7 8 9 10

3 3.1 3.2 3.3 3.4 3.5 3.6 3.7 3.8 3.9 4 HV, kV

Sigma, nsec