EMU_CSC_Trigger_Beam_Test_RunNum472_Oct_2004_CERN

Number_of_Comp

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 1.133 RMS 0.4435 Underflow 0 Overflow 13 Integral 984

Entries

0 100 200 300 400 500 600 700 800 900 ME1/2_Layer_1

Number_of_Comp

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 1.126 RMS 0.4305 Underflow 0 Overflow 13 Integral 984

Entries

0 100 200 300 400 500 600 700 800 900 ME1/2_Layer_2

Number_of_Comp

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 1.05 RMS 0.4871 Underflow 0 Overflow 17 Integral 980

Entries

0 100 200 300 400 500 600 700 800

ME1/2_Layer_3

Number_of_Comp

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 0.882 RMS 0.5987 Underflow 0 Overflow 14 Integral 983

Entries

0 100 200 300 400 500 600 700 ME1/2_Layer_4

Number_of_Comp

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 0.798 RMS 0.6185 Underflow 0 Overflow 12 Integral 985

Entries

0 100 200 300 400 500 600

ME1/2_Layer_5

Number_of_Comp

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 0.7817 RMS 0.6484 Underflow 0 Overflow 12 Integral 985

Entries

0 100 200 300 400 500 600 ME1/2_Layer_6