EMU_CSC_Trigger_Beam_Test_RunNum472_Oct_2004_CERN

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 1 Mean 11 RMS -0 Underflow 0 Overflow 0 Integral 1

Entries

0

0.2

0.4

0.6

0.8

1 ME1/2_Layer_1

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 3 Mean 46.5 RMS 43.5 Underflow 1 Overflow 0 Integral 2

Entries

0

0.2

0.4

0.6

0.8

1 ME1/2_Layer_2

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 54 Mean 38.05 RMS 24.36 Underflow 10 Overflow 0 Integral 44

Entries

0

5

10

15

20

25 ME1/2_Layer_3

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 198 Mean 29.34 RMS 19.58 Underflow 54 Overflow 0 Integral 144

Entries

0

20

40

60

80

100

ME1/2_Layer_4

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 280 Mean 41.62 RMS 72.67 Underflow 42 Overflow 0 Integral 238

Entries

0 20 40 60 80 100 120 140

ME1/2_Layer_5

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 286 Mean 43.74 RMS 86.56 Underflow 51 Overflow 1 Integral 234

Entries

0 20 40 60 80 100 120 140 ME1/2_Layer_6