EMU_CSC_Trigger_Beam_Test_RunNum472_Oct_2004_CERN

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 985 Mean 967 RMS 354.5 Underflow 0 Overflow 112 Integral 873

Entries

0

10

20

30

40

50

ME1/2_Layer_1

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 985 Mean 972.1 RMS 362 Underflow 1 Overflow 114 Integral 870

Entries

0

10

20

30

40

50

ME1/2_Layer_2

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 985 Mean 870.9 RMS 409.6 Underflow 10 Overflow 131 Integral 844

Entries

0

10

20

30

40

50

ME1/2_Layer_3

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 985 Mean 713.6 RMS 462.3 Underflow 55 Overflow 87 Integral 843

Entries

0

20

40

60

80

100

ME1/2_Layer_4

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 985 Mean 656.7 RMS 521.5 Underflow 42 Overflow 94 Integral 849

Entries

0 20 40 60 80 100 120 140

ME1/2_Layer_5

Cathode_ADC_Sum

0 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries 985 Mean 631.1 RMS 501.5 Underflow 52 Overflow 95 Integral 838

Entries

0 20 40 60 80 100 120 140

ME1/2_Layer_6