EMU_CSC_Trigger_Beam_Test_RunNum472_Oct_2004_CERN

NAlcts

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 1.033 RMS 0.2192 Underflow 0 Overflow 0 Integral 997

Entries

0 100 200 300 400 500 600 700 800 900

HCAL_ME1/1

NAlcts

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 1.032 RMS 0.1873 Underflow 0 Overflow 0 Integral 997

Entries

0

200

400

600

800

1000

ME1/1

NAlcts

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 1.071 RMS 0.2796 Underflow 0 Overflow 0 Integral 997

Entries

0 100 200 300 400 500 600 700 800 900

ME1/2

NAlcts

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 1.09 RMS 0.3101 Underflow 0 Overflow 0 Integral 997

Entries

0 100 200 300 400 500 600 700 800 900 ME2/2

NAlcts

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Entries 997 Mean 1.082 RMS 0.3341 Underflow 0 Overflow 0 Integral 997

Entries

0 100 200 300 400 500 600 700 800 900 ME3/2